oe) U3

is

an

st

his

THE CORPGRATION OF THE CITY OF PORT COQUITLAM

MEMORANDUM

TO; City Administrator February 12,

FROM: City Engineer

SUBJECT: Royal Canadian Memorial Cairn Public Works Committee February 10, 1987

Recommendation:

That the Royal Canadian Legion be allowed to install a Memorial Cairn on the grass area [In front of thelr bullding subject to the exact location being discussed with the City Engineer to ensure that there are no service conflicts.

Background and Comments:

The attached tetter was reviewed by the Public Works Committee and the Committee has no objections to granting this request.

As the proposal did not Include a sketch, It will be necessary for the Engineer to check out the actual location to ensure that there are no services underneath.

oun <6

F.E! Peters, Pe. Eng., City Engineer

FEP: jth

attachment

F-~FEB/87 (14)