January 30, 1989/018

Moved by Alderman Stewart: Seconded by Alderman Farnworth:

That Bylaw No. 2408 be read a second time.

Carried.

Moved by Alderman Stewart: Seconded by Alderman Farnworth:

That Bylaw No. 2408 be read a third time.

Carried.

CORRESPONDENCE:

From the Corporation of the District of Powell River, January 25th, 1989, regarding Franchise Agreements for the distribution of natural gas.

Moved by Alderman Farnworth: Seconded by Alderman Gates:

That the matter of Franchise Agreements for the distribution of natural gas be tabled pending receipt of further information from Powell River.

Carried.

DEVELOPMENT VARIANCE FERMIT:

From the City Clerk, January 16th, 1989 regarding Development Variance Permit No. 76/88 for 1774 and 1780 Morgan Avenue.

Moved by Alderman Gates: Seconded by Alderman Stewart:

That as recommended by the Director of Community Planning in his memorandum of January 5th, 1989 a Voluntary Development Variance Permit be issued relaxing the Subdivision Bylaw No. 2241 Section 4.2.3, cul-de~sac bulbs to Lots 2, 3, 4, and 5 of D.L. 255, Group 1, N.W.L.D. Plan 17243.

Carried.

REPORTS:

From the City Engineer, January 26th, 1989 regarding Water main upgrading - 2300 Block McAllister Avenue.

Noved by Alderman Stewart: Seconded by Alderman Keryluk:

That the City Engineers recommendation regarding the Water main upgrading ~ 2300 Block McAllister Avenue be tabled for one week.

Carried.