1.5

CONTRACTOR

The Contractor is the person, firm, or corporation

contracting with the Client to provide labour,

materials, and equipment for the execution of the Work.

SUBCONTRACTOR

A Subcontractor is a person, firm, or corporation

contracting with the Contractor to perform a part

or parts of the Work included in the Contract, or

to supply products worked to a special design

according to the Contract Documents.

SUBSTANTIAL PERFORMANCE

Substantial Performance of the Work is as defined

in the Lien legislation applicable to the place of

the Project. If such legislation is not in force or

does not contain such definition, Substantial Per-

formance shall have been reached when the Work is

ready for use or is being used for the. purpose

intended and is so certified by the Architect.

ARTICLE 2 ARCHITECT'S SERVICES AND RESPONSIBILITIES BASIC SERVICES

The Architect's Basic Services consist of the

six phases described in Paragraphs 2.1 through

2.6 and include normal structural, mechanical,

and electrical engineering services and any

other services included in Article 13 as part

of Basic Services.