tq vot Wenge ee

ih eharat vig

lye ended i

a . te are) A /, , yee ely eee ted unt ag hy s . : tet : y ? aR ‘ ON arbre fb beh Ona ca he | vane id Oe eR ye t. :: { ; wy HTM Ste MN Uy vals bon a ial ee i, . 4 wees - Te ME Lees Open

PLUMBING PERMIT FEES (MARCH 1:99)

LANGLEY M.R. MATS N.WEST N.VAN. COQ. P.COR, | ' AVERAGE MINIMUM FEE 21 25 $0 32 SAN. SEWER CON. 26.4 91 30 30 30 25 19 27 STM: SEWER CON. 26.4 31 30 30 30 25819. 27 EACH FIXTURE 13.4 14 10 15 16 15 18.6 14 FIRST SPK.HEAD 13.4 33 30 14 44 25 30 27 ADD SF. HEAD 0.3 0.82 1.78 1 An 1 0.9 i FIRE HYDRANTS as 10 16 1G 8S 20 FIRE DEPT CON. 13.4 10 16 18 19 1% HOSE CABINETS 10 16 18 19 1s EACH STANDPIPE 16 18 19 17 WATER MAIN ©M) 0.64 0.66 0.85 0.63 0.65 SANITARY SEWER 0.64 1.2 0.5 0.67 0.8% 0.65 STORM SEWER 0.64 0.5 0.67 0,83 0,65