(Value of Improvements not to exceed $300,000.00)

a. A multi-purpose grass soccer/sottball field, fully sprinkled with 4 sand base, of a size to be determined on the basis of site suitability given slopa conditions and limited working area; be A detailed park master plan for integrated development of schoo! fields and park property; Ge Regrading and landscaping as required to satisfy master plan; : d. A water fountain; x @-e Combined school /park parking lot. | All facilities to be constructed within the power line right-of-way are subject to the City obtaining any necessary approval from 8.C. Hydro and Power

Authority.

: | Site 4: (Value of improvements not to exceed ($30,000.00)

@e Regrading and berming as required for landscaping purposes;

a bs Hydro-seeding; pose 8

oe a Ge Park bench(es); _ . — oa

po , ds. One piece of children's playground equipment; aan Foe

a @e A minimum of twenty planted 2 1/2" caliper or larger trees plus

related shrubbery; oe are

f. A 20 mn water service connection tolproperty fine; ea

: ge A crushed rock pathway system.