ie SVE 2

Shae

DISASTER TT aT fd

“ ty!

dap ah! Lich oe ee

iar

On New Castle Place at the North-west corner of Westminster Avenue,

On Nova Scotia Avenue at the South-west corner of Pitt River Road,

On Victoria Place at the South-west corner of Victoria Drive."

6. Section 1 of Schedule "C" of the By-law by inserting the following location of a crosswalk in its correct alphabetical location:

"Crossing Shaughnessy Street at the North side of Fraser Avenue."

7. This By-law may be cited for all purposes as the “Traffic Regulation

By-law, 1971, No. 1117, Amendment “y-law, 1977, No. 1550".

PEM beats