MEMORANDUM

TO: N. Chernoff, . ' ‘December 23rd, 1975 Chief Building Inspector. :

FROM: V¥.G. Borch, P. Eng. c.c. Mr. G. Battiston

Re: Warehouse at Kinasway and Tyner - G. Battiston

. The following are the offsite servicing requirements for the above proposed development: '

3/4" Diameter Water Connection — $ 130.00 4" dfameter Sanitary Sewer Connection . 140,00 6" diameter storm Sewer Lonnection to . ; Tyner 1,100.00 8" diameter Storm Sewer Connection te Kingsway | | 699.00 Underground Electrical Connection ‘to be refunded followina ; installation) _ 1,503.00 Road Widenina on ingsvway 7,600.00 Type A Curb & Gutter on Kingsway and cn Tyner 9,800,00 Road Ceustruction - Tyner . 15,800.00

TOTAL $25,679.00

With the exception of the underqraund electrical connection it 1s intended that ai7 the work would be desiqned by the Enqineering Department and installed or constructed: by the Engineering Department.

: fy ‘ V.G. Md. PL, Engq., City Engineer.

Sw Re ae

.-

Jaden stents sme oA,