Buiiding Department:

"The lot with the existing house will require: driveway and parking it's own water and sewer service

Items to review in 1.2 m sideyard: unprotected openings encrouchment of steps or landing for existing doors." Engineering Department: : ‘Sanitary - Existing, no upgrading required. Service connection only.

Water ~ Existing, no upgrading required. Service connection only.

Roads — Curb and gutter, sidewalk existix¢ along Hastings frontage. Additional driveway letdown requ: ved.

Storm - Service connection only.

Lane - At present, lane north and rear of property is unopened. Section 404 of the Subdivision Servicing Bylaw states that the lane be upgraded to City standards. The developer would require a Development Variance Permit to maintain the lane as unopened right of way.

DISCUSSION:

‘The proposed rezoning will result in the increase of one single-family lot in a single-family area that has some potential for additional infill. The impact of the creation of this lot in the neighbourhood will be. minimal,

therefore the Planning Department can support tnis application.