. A site plan must accompany each application to the Board of Variance and

the following information:

1. Size of Lot and Buildings

2. Siting of all buildin Property lines

3. Siting of Proposed addition to be sho setbacks from property lines

4. Site plan ta be sh

g@ to include measurements of setbacks from

wn in dotted lines: and to. show

own below or on « separate sheet no larger than. B3y"* x 16" Sample Site Plan: Leow . ; if ce a 4 ‘ { a . , pie write mw. i ets srraer

ee ee Seema eemesrrecsescccene Pow serecvrenve

ee ee ee ry

Actual Site Plan Relating to Application made on Reverse Side of this Form:

Signature of Owner

This Form is provided for your convenience and you should feel free to submit any additional information that will be of value to the Members of the Board of Variance in the consideration of your Appeal :

23 -

must show