ROWLAND STREET

Prave Two

proposed atte cree 24095 9.1.

proposed liver area S4983 61.

Phase lives Proposed ste siee Mie e8 Opened buiing one too ene 2484484.

244.4

(Sena

Prace One

prepmed ote aes 22268 04.

proposed Itsor ore 20207 ef.

picipanelti de A

Phase Ties proposed bulking two oor wen . 23027 at.

YS Lar, oy | = Oo

La |

SITE PLAN

SCage wee fo

; ak: MOONEY

ARCHITECT

WE WATER ‘ST VANCOUVER: 2 VOREC6. 7682 2866.