sateit Yate rie

ah

i aie

ap eee ena fe Na NT tees b. efh

on

QServuicine I ~ mo im Marshall / Stattord Sevelopment

- Oistrict Lol Boundary dD. Liz ?,

{

7 Plon 84245 $s

Rut 5AM. WW. 2782 us | Pion (0390 : eran 96493 sau, Ife | oo| 24 23|22 21120

' a ie SRW, Ex, Plan E4242 Pion 36448 fo = one ee at te =, 08, SIS Pien 2396

an

505455"! eer <a ee aw eee

aeererrenrnrwe eh A SDD Fi,

"= 3.000 Ae 225 SOLS AS! oe

R= 14,000 "Ax40,66!

cay a

pr ”

JS599715"

tape $ « POAL

oa fr)

0.8442 ha,

Pion 49575

90° 15°10" AER = lon 117476

! sanz , 86.675 _— , 2349 0%% anal “OO TS SS oo <o nang

‘

wae aud "<€" Sha 4

n 305?

4

SRW Ex. Pl

at8S

=3 STAFFORD an a

. ad

Ra29.522

An29, .

90° 15°20" - 90°15‘20

30.046 18.553 ¥S5'4

ae cee oe O

.

Cl eT uncoid to set 120° 15°20 60'15'20"