CITV_OF PORT cORUITLAM —MAROG/EL

A/P CHEQUE REGISTER ~ BY CHEQUE # . PAGE:

VENDOR PAYMENT . FIELD

00558 SHO110.. SHELL CANADA LIMITED, a 00559 STO190 STEWART, WILLIAM {4 .

00S61 TAGISO TAYLOR PEARSON & CARSON (B.C.) EQUIP. PARTS/RENT/S TEOO70 TERMINAL CITY IRON WORKS LTD. WATER OR SEWER SUPP 00543. VA0010 VALLEY MEFICE EQUIPMENT LTD OFEICE EYPENSE 00564. VEOQO10 VEERMAN, TINEKE. CONTRACT PAYMENT 00565 WEOQO?9S WEST COAST RADIATOR AUTO PARTS & SERVIC 00564 WEOL10 _ WEST COAST WELDING. WELDING SUPPLIES. 00567 WEO130 WESTERN AIR COOLED ENGINES LTD AUTO PARTS & SERVIC 00sé8 WEOSZO WESTWOOD TIRE SERVICE LTD.» TIRE SERVICE RECREATION SERVICE/ 00570 WIO00Z0 WICKLUND, DON PETTY CASH WOOOSO WOMETCO (B.C. >) LTD.. CONCESSION SUPPLIES | ie 2 » eee

yuooio0 YULE, JAY — REFUND

shoanungmaniebosin ht etre

TOT AL. P44 YY MEN T S_:

Rea emenaa

comets!

pseattek