" 4 edly ieastat : islaeheanpadesik Niplantiato otubemnh alien eine ort ‘ Af Ana " fy eh : SLIPS of ae ay ShisEne : 5 aNd he Bune

COMMENTS FROM OTHER DEPARTMENTS:

Building Depa: tment:

ao

Building plans will be reviewed for Building Code compliance at the time of permit application.

hte

R.C.M.P., Parks and Recreation Department, Engineering Department, ire Department:

No comments.

DISCUSSION:

The floor plans submitted by the applicant are creative and address very well the problem of the subject lot. Although a number of significant relaxations are required, due to the ingenuity of the design, this residence's looks will not be at odds with other single-family residences in the area, in terms of its volumetric impact and apparent siting on the lot.

The Planning Department recommends that this application be approved.

ID539-7/8