‘ee

LDP/w /

m= COQUR

TO: Mayor and. Council May 9th, 1975 MAY 12 975

FROM: Heusing Committee

The Housing Committee has completed a report covering a number of aspects of

the housing situation in Port Coquitlam. This report, together with recommendations has been circulated separately to members of Council and copies are available

for the Public. :

. The Committee vill comment on the contents of the report, and will in due course

wish to deal with the recommendations in the report when Council is prepared.

EE.

L.D. Pollock

SHEET Cran lig Colgate agen ere arr