July 12th, 1976

the subject had been discussed by the Public Works Committee and it would be their recommendation that rather than leave the area as is, the site be grassed in and a gravel access road to the Women's Centre and Centennial Pool be provided.

Moved by Alderman Mabbett:

Seconded by Alderman Laking:

That the resolution adopted May 3lst, 1976 with respect to the paving of the former Aggie Hall site, be rescinded; AND THAT the site be grassed and a gravel. access road constructed

to the Women's Centre and Centennial Pool at a cost of approximately

$1,000.00.

Carried,

! Bldg.& Prot.Comm. From the Senior Building Inspector, July 8th, 1976 advising of the

/ re new Street Names recommendations of the Building and Protection Committee for new street

names for the City.

TERETE ME ENS Sone amet oe,

Moved by Alderman Ranger:

Seconded by Alderman Thompson:

That as recommended by the Building and Protection Committee and

SY NI Bn ee oh Nena a emanate ary

contained in a report from the Senior Building Inspector dated July 8th, 1976, certain new streets in the City be named as follows:

Victoria Place, name of cul-de-sac off Victoria Drive.

Western Place, name of new subdivision off Western Drive,

Access to Somerset Place through future subdivision off Cedar

on en ee tee ee

Drive.

be approved.

Carried,

During discussion of the foregoing resolution, Alderman Traboulay

suggested the use of some U.S. names for Streets in view of the American

Lynden, Washington, | Bldg. &Prot. Comm. From the Senior Building Inspector, July 8th, 1976 being a report

ir@ canopy const. iRedd'a Flue . of the Building and Protection Committee with respect to a canopy construction

s = h- | nosey gue at Reid's Hardware - 2555 Shaughnessy Street, and requesting Council /

i f | bi-centennial and also the recent visit to the City of the Mayor of i } i t

approval for same.

Moved by Alderman Ranger:

Seconded by Alderman Laking:

That the report and recommendation of the Senior Building Inspector