Report to Mayor & Council Cont'd...

Because of the need for the permanent bridge structure over the Broadway Street ditch, the cost of constructing the transfer station will be approximately $20,000 higher. However, Council may wish to allocate this additional $20,000 expenditure to a program other than the recycling program since this bridge structure will actually serve as the main entrance for all uses of 1675 Broadway Street, in the future. (i.e. Public Works, Parks, etc.)

The City crews and contractors are ready to commence construction on the site on July 16, 1991 providing Council approval is obtained. A four to six week construction period is stull planned and we are still optimistic of achieving our September 3, 1991 start up date.

aoe

C.F. (Kip) Gaudry, P. Eng. Deputy City Engineer

B.R. Kirk, City Administrator Jon Bailey, Fire Chief Jaruia Taylor, Director, Parks & Recreation