RSDAY, JULY 8, 1971 ; " ‘TERRACE HERALD, TERRACE B.C.

Free. Delivery

Years on Refrigeration Unit Years Against Food Spoilage

‘Cubic Foot Holds 705 Lbs.

199"

22° qm EASY

Foot Foo+

Holds 285 Lbs. Holds 425 Lbs. oo“ Hotds sis ths oe a — MONTHLY 168" = 178 = 188% Parmens-

_ ypsessassassassassassssessassassssssssssssssssssssssssssssasssssy

'* sFREE TURKEY, '

. . + —— COUPON— s $

$>

. Panco grade A Turkey absolutely fi free alt ae have. to do is ‘present this Coupon when You purchase your. Freezer on Tharsiay,

ww. Se wi. ae wa wr. V-. Ad wi Aud cad "i ae ww Ad bid

ssabisiaviivieavatviewede

odd 4 3.

_Ressasssssssssnssssssssssssssssssssssssssssssssusssssssssssssast

ea

we: 8S

Thane Are the ficonc Charge | iH” People