BROADWAY

——— CPR rail line:

masmaen Recommended New Road to improve municipal traffic circulation / access

@ Location where access is eliminated to Mary Hill Bypass ;

‘ara Hill By pass NO Lee Consultants Sted

oe aly ; 1440. -

ots, Figure 3.6 oe a ‘Suggested Modifications to City of Port Coquitlam Road Network

s

TEM