tps i

val leg

ay

To work under the direction of the Parks & Recreation Director and to liaison with Other staf persons as deemed necessary.

Meet with the various Sporting groups (including P.C.A.A.WA.) and other community organizations

for their input as to the perception of their future requirements,

The conceptual plan is to include plans for both passive and active recreation. Specifically;

A) Active Areas; Identify athletic Spaces and sizes for later detail design work Identify the kind of surface Coverings required Identify other active areas as deemed appropriate

B) Passive Areas;

i) Identify kinds of Spaces and size of spaces.

4, Test the soil conditions in order to determine if there are any special requirements

To include the Coquitlam River as a potential recreation area

patterns and parking requirements required

Develop traffi for the park i

CG £

Develop the ancilliary facility requirements for the active and passive areas

That facility standards that may be used as a start~ ing point be equivalent to the standards used in park development in adjacent municipalities; such as the City of New Westminster, the District of Coquitlam, Pitt Meadows and Maple Ridge,

Construction and development costs must be in 1985 dollars,

a) Facilities must have a life Span of at least 25 years,

To conduct a series of public meetings for input into the plan of the park.

To develop a ten year capital works program for the construction and development of the park.

32