eee '4\ 63 756

THOMPSON is id fase el PARK iofialar | 16

20 is L771) BH SD) SI fiFAT VITA | PEKRUL PL.

FES BIESIEO S2)48| ¢4 SyT PS] gyropuyi2gis G2jees

CAMERON

REM WS

S7FP2L-MIS

SP NW ID77

: . TBS » oe 18 ov lee | as um 8 1 evyruee FIRE

1957 (899 7 H1#Ait. LOCAT! ON CONNAUGHT 190d

4

18

ww

rslea|zt|zo]@] | |S TRANSFER STATION

MENZIES

153

285i2aa[243)

SP 4e4 st SP ado} 241 | 242 27}

Tt | M7 GES) 1689 152

Ry

3 . A. #4235 [237]2 #6. 150 | 61

|

146

9 249247 246

Ex. AL, 23385 A

TAYLOR é g

143

| wes poe MAGELLAN 2

H

aes | ses7 [1643 385] 386 | 397

ig

” fess sw | eer| se 144

(1611) 1617 lies

BROADWAY

AL. Gs

‘8

821 |$22}523 {524 PS sh 57 EH “CAMPBELL

Apt ms -_ , $4 53 301537 Bary. : ‘445/419 | 416 | 417 14 : ; fo Ae 1939 | (Der | ATS | r92I tof ; : _- PL ¥t21064 “ ROOGER. ne | (ONE ‘(1958, a 463

a sad

PL GIS

PP MSi| ES “a2? | 426 ]429 | 430

462

10

SSS heed tear 7e33

STEWART

Pres | t4e$ °459. 1460

ny . easy Aes OHEve