Director - Fire Services Fire Chief

Burnaby Fire Department Vancouver Fire Department 4867 Sparling Avenue 900 Heatley Street Burnaby, B.C. Vancouver, 8.C.

VSG 1M2 V6A: 387

Fire Chief Fire Chief Richmond Fire Department Port Moody Fire Department

6960 Gilbert Road 200 Ieco Road Richmand, B.C. ; Port Moody, B.C. v7C 3V4 V3H 333

Fire Chief

Pert Coquitlam Fire Department 2352 McAllister Avenue

Port Coquitlam, B.C,

V3C 281

LL. ; In the case of any dispute arising between Parties as to their respective tights and obligations under this Agreement, a Party shall be entitled to give to another Party notice of such dispute and to request arbitration thereof; and the Parties may, with respect to the particular matters then in dispute, agree to submit the sama to arbitration in aceordance with the Arbitration ac#, R.S.8.C., 1979.

IN WITNESS WHEREOF the Parties hereto have caused to be affixed their seals attasted by the signaeeras of their respective officers duly

authorized for such purpose.

THE CORPORATE SEAL of the CORPORATION OF THE CLTY OF NEW WESTMINSTER was hereunto affixed in the presence of

THE CORPORATE SEAL of the CORPORATION OF THE CITY OF NORTH VANCOUVER was hereunto affixed in the presence of