THE CORPORATION OF THE CITY OF PORT COQUITLAL C Q (] \

FIRE DEPARTMENT — OCTOBER 1975 HOV 10 1975

HOUSE FIRE . DAMAGES $300.00 CAR FIRE DAMEGES 50.00 APARTMENT

PROVINCE PAPER BOX

BROKEN WATER TANK

GASOLINE SPILLS

INHALATOR CALLS

PATIENTS TRANSPORTED

FIREMEN ATTENDED MAN HOURS

VOLUNTEER's REMUNERATION $270.00 VOLUNTEER'S PAGED 2

2 FIREMEN OFF SICK TOTAL 10 DAYS

Total damages $350.00. Approximately $300.00 damages to the bedroom ofa home when

fire started in a bed caused by owner smoking in bed. Three car fires: with little

or no damage resulting to two and about $50.00 to third caused by an electrical short. Called to an apartment when a small fire started in a pan of grease while cooking supper, “no damage. ; .

55 Inhalator calls: 33 home emergencies, consisting of strokes, heart attacks, epileptic seizure, asthmatic attacks, falls causing injuries, people suffering with the flu anda number of breathing problems. 2 calls to industrial plants, 4 motor vehicle accidents.

4 overdoses, two attenpted suicides and 3 over indulgence in alcholic beverages. 3 people hit by cars in separate accidents. Attended 5 separate sports sports accidents, one swinming, two on the ice and two on playgrounds.

The fire department had no calls on haloween - pertain to the same.

Summary to date and for same period in 1974.

2975 1974

Fires and related incidents . 166 damage $27,350.00 211 damages $464,450.06: Inhalator calls 455 385 Patients transported 404 298

See attached sheet for inspection and ambulance service.

WSW/lse c.c. LD. Pollock W.S. Wingrove R.A, Freeman Fire Chief