FIRE PREVENTION INSPECTIONS

4 s 7 8 9 iO = 2 13 4@ 15 16 GASOLINE FUEL OIL

Nn Oy @ is) N

LY TOTAL

1G 0b

DATE

NO ENTRY CABARETS PUGUC ASSEMALY] HOSPITALS INSTITUTIONS TO DATE TO DATE

QUILDINGS CHIMNEYS

COMPLAINTS NOTICES RECHECKS

DANCE MALLS COMPRESSED OAILY TOTAL MONTHLY TOTAL) —

SCHOOLS INVESTIGATIONS

INSPECTIONS ~ EYEAR

Melby fi?

~ [SS

CHAE,

Py FLAP. PL fi JG Ro By BN 1 JO Lp

PS hs IN Dy

ww N NK RUS INI Reds SHR PTY Pole baka ls Ini k

S 3

———_—. Cikyof Por t. Coquitlam Gaim z do B.C. Amb lane fae enee _ TaawatyantaFeheuary 1977

j

Cott _Out_Pay ments, Vehicle and £4 vipat Rerdals

Di spatching (Oct, Nex, Dee. 1976)

Gos ol + nepaica Carl vehicle

baundes einen st Fiewk AA Supplies Garage Rental

Other Reveterniele Casts

Tyrol ile Lite Rotulance Servier

Fetal hcl aud

xX. Maitland Maoh 3/27.

weet LTT 1d.