A sign structure supports a freestanding sign and the sign and supporting structure combined exceed three metres in height or four metres in width;

The professional design requirements of Section 8 of this Bylaw may be applied to a sign structure at the discretion of the Building Inspector where the Inspector considers that the site conditions or the size or complexity of the development or an aspect of the development warrant.

No plumbing permit is required for the clearing of stoppages or the repairing of leaks in pipes, valves or fixtures, when such repairs do not involve or require the replacement or re~arrangement of valves, pipes, or fixtures or hot water tanks.

Subject to the requirements of any other Bylaw, a Building Inspector may issue a building permit for the erection or placement of a temporary building or structure, if satisfied that the building or structure is safe for the stated use and

duration.

A Building Inspector may revoke a permit where there is violation of:

7.91. any condition under which the permit was issued, or

7 o9ude any provision of the Building Code or this Bylaw.

Revocation shall be in writing and transmitted to the permit holder by registered mail.

Disclaimer of Warranty or Representation

Neither the issuance of «4 permit under this Bylaw, the review and approval of the drawings, plans and specifications, nor inspections made by the Building Inspector, shall in any way constitute a representation, warranty or Statement that the Building Code or this Bylaw has been complied with or that the building or structure meets any standard of materials and workmanship, and no person shall rely on any of those acts as establishing compliance with the Building Code or this Bylaw or any standard.