Sete foie

a . Be iareeesiene) "ds

oe “Oe WERE mes Paiges a

oe iaviiets Sanit a gh i Tare ae, : wi sag

REPORT TO COUNCIL Cont'd

eof ©

on SR

D.G. Riecken, P. Eng. , Deputy City Engineer

DGRige

attachments

CITY TREASURER'S COMMENTS

I certify that funds are available recommendation.

for the purpose noted in the

SOT megs ne nee teeming