ARTICLE 42

SIS OF COMPENSATION

The client shall comaensate the Architect for the Scope of Servi

Payments to the Architect. and the other Terms and Conditions TT ANINITALPALMIENT af = 0 ~ :

shail be made upon exccutian of this Agreement and credited to the CI

of this Agreement, as follows:

fent’s account as follows:

BASIC CONIPENSATION $10,000 as Per architect's lotter dated Dec. 10/80

VT FOR BASIC SERVICES, as described in Paragraphs 2.4 thraughSit and any other services set outin Article 1B ac part at Basic Services, Basic Compensation shall be computed as follows:

Tet compensation, inctudiag ined amounts, muluples, of per

; centages, and identity Phasesto which Pacticuler methods of compensation ,

Assist client in Preparation and assembly of Planning information relevant to the prelinirary design, assistence in preparation of building budget as per 2.1.2, Site analysis, site selection and Preparation of Gesign patterns. Preparation of roush preli vinary site and floor plan

of 1/3 of total fee

Payrent Phase Ti, see ase at

Preparation and development of sketch design plans, elevations and schetatic sections . .

Parent of 2/3 of total fee Payvwont Phase IIT, et ese tid Cexpleticn of architectural Tor public referendum

Paysont ef fee in full

$3,300.00

$3,300.00

sketch design presentation prepared

$3,460.00

J2220 Where compensation is based ona Stipulated Sum or Percentage of Construction Cost, payments for Basic Sernices chall be made as provided in Subparograph 5.1.2, so that Basic Compensation for cach Phase shail equa! the intowing percentages of the total Basic Compensation Payable:

Baw inde ane a hlere st Phos ca, aperopiadn y Schematic Design Phos wy Brora Derde eon a CoAstesteen Deaime A Bring <a eens Censt ee teon dace.

Seite Ee ween ne percent.) Postecure trretien Binet ---o2-noeanencele eee TT

Atm wn nn -PEeRb fa 2 ne FOR CGNTINGOUS REPRESENTATION AT THE SITE, as described in Paragraph 2.7, Compensation shall be compuied separately im accordance with Subparagraph 2.7.2

RAIC DOCUMENT 6 — 1978

HL

ces provided, in accordance with Anticle 5,

dollars ($0.00 }

12.4 COMPENSATION [OR ADDITIONAL SERVICES if required as agreed by Soth sarties,

12.4.4 FOR ADDITIONAL SERVICES OT THE ARCHITECT, as described in Parapraph 28,and any other services included in Articte 13 as part of Additional Services, but excluding Additonal Services of consultaiits, Compensation shail be computed as follows:

Here. insert bast of compensation, including rates and us muliples et Direct Personnel Expervesioe Principals antemployres andsleanty

Primeipat god Clastily employees, if eeepneed denny specie ternces to which parneutor methods of eompenrnon apply, d necersery }

Tf required, as per hourly rates charged by consultants offices at the tine,

12.4.2 FOR ADDITIONAL SERVICES OF CONSULTANTS, including additicnal structural, mechanical, ard electrical engineering services and those provided uncer Subparagraph 2.8.21 oridentihed in A ticle 13 a5 partof Ad ional Services, compensation shall be computed as amultiple of ( “Ftimes the amounts billed to the Architect lor such services.

Cdentity specific types of consultants wn Article 13, if sequiredy

125° FOR REIMBURSABLE EXPENSES, as described in Article 5, and any other items included in Article 13 45 Reimbursable Expenses, compensation shall be computed as a multiple of

(2.25) times the amounts expended by the Architect, the Architect's employees. and consultants in the interest of the Project.

12.6 Payments due the Architect and unpaid under this Agreement shall bear interest from 39 davs after the

date payment is due at the annwal fate entered below, or in the absence thereol, at the prise reve Prevailing at any chartered bank at the Principal place of business of the Architect Plus tivo percent.

(Here insect any rate of invecest aarecd upon}

(Federal ancl Pros incial watutes and ercutat ns af the Chent’s ano Architect's principal places of taniness the faratron nbibe Prev oet aedeivem torr = sy affect the vals Dt rhe prosseen Speute legaladece should be obtained wah roped tu getetion, mod HIN. OF CUBET Teepe MEE MOET os Titte * ela iares OF wareers J

12.7 The Client and the Architect agree in accordance with the Terms and Conditions oi this Agreementthat:

12.7.1 IF THE SCOPE of the Project or the Architect's Services is changed materially, the amounts of compensation shall be equitably adjusted. 12.7.2 IF THE SERVICES covered by this Agreement have not been completed within

{ SIX) months of the date hereof. through no fault of the Architect, the amounts of compensauen, fates, and multiples set forth herein shall be equitably adjusted.

RAIC DOCUMINY 6 — 1975 vf

4, ¢

de

_ ae

Mu

Sek

aesigers pes)