THE CORPORATION OF THE CITY OF PORT COQUITLAM

MEMORANDUM

MEMO TO: Igor Zahynacz August 20, 1991 City Engineer

MEMO FROM: Gordon Voncina Operations Manager

SUBJECT: Cedar Park Walkway

As requested, I have provided an estimate for the paving of the Cedar Park walkway as an option to the bridge improvements.

Enclosed, please find two (2) detailed estimates for the: paving work and a map illustrating the proposed location of the asphaltic surface.

Option 1 _ This work consists of paving 360 m2 of asphalt at a 50 mm thickness, including -Testoration of the surrounding grass areas disturbed as a result of the work.

roa estimated cost for Option 1 is $6,837.

This option includes all of t the work outlined in Option 1 with the addition of 50 mm of 19 mm minus base gravels and the installation of a black poly membrane to minimize _ vegetation penetration of the asphaltic surface. ( 5 / tw | che ) |

_GV/al “enclosed