a

POOLEY i 2/3.)4 le : -— TO BE REZONED AS-2 axel ii © } 5 = 7 10 Ni WA 79 wr a © x PL 288 T w = vt (tH ; a -

(aN) sr _. aw x A} bs es ° CG ante sit} - | + a . 8 3 .

- tau ge ° | 5/| 8 tw

Ts fe ain E : NLT.

iy S || & aL SCALE: N.T.S. S om 2 5 zZ SF 2 _

— & 8 | § o || os 516} 517] 518 | 5I9|52d52! |so2/se3 /524 | a & V5 PL} S479 407 7 S] 728

a | 19 va)

3 B | Lis CAMPBELL

Ww) oO t

© iB < MP Hf | Re | Silla } |

YLAW 2303