3) In this case under the revised procedure , the proposed building addition will be described in an agreement that will be attached to the original L.U.C. Bylaw No.1609 by a bylaw.

The proposed amendment to the L.U.C. is to convert a balcony to a seating area in the pub. What this entails is.to construct walls, enclosing the open area and to install required building improvements for the additional occupants,

In conelusion, this is a minor amendment and its approval is being recommended.

ee AP ee,

elt Sale tens