Voyage en Afrique

Le Gabon,

suite André Piolat

6 Déc. De retour a l’hotel, aprés notre visite chez le Chargé d’ Affaires du Canada au Gabon, nous apprenons que deux autobus attendent, pour emmener les délégués des pays représentés a la réunion de l’Agence de Coc- pération Culturelle et techni- que, qui veulent participer a une visite 4 I’Ecole des Terres et Foréts, a une cinquantaine de Kilométres de Libreville. Nous sommes invités 4 nous joindre aux délégués et autres représen- tants des médias.

Les autobus quittent Libre- ville, nous sommes bientét en pleine forét, nous roulons sur

- une trés bonne route en

asphalte, au-dessus de nous, nous entendons le vombris- sement des avions de chasse militaire: Mystére ou Mira- ge. Car c’est la France qui fournit l’armement a ces anciennes colonies. On dirait que le gouvernement gabo- nais, profite de la présence a Libreville de représentants de 27 pays pour les impres- sionner par un déploiement de sa force militaire aérien- ne.

De chaque cété de la route, la végétation est dense et luxuriante, par-ci par-la on voit des tas de billots, qui attendent d’étre chargés pour le transport 4 une scierié, on rencontre quel- ques camions chargés de billots, si ce n’était pour la végétation tropicale et la chaleur, on pourrait presque se croire dans certains coins forestiers dela Colombie-Bri- tannique. —

Nous arrivons a une clairié-

-re, entourée de b&timents —

peints en blanc aux toits en téle. Ce sont les batiments de l’Ecole. Quelques profes-

- seurs et éléves nous accueil-

lent. Les professeurs sont presque tous gabonais. Com- me ailleurs en Afrique fran- cophone, aux débuts, les cadres étaient entiérement européens, puis petit a petit, ils sont remplacés par leurs

-éléves, qui a leur tour,

deviennent professeurs et enseignent a leurs cadets. Le doyen des professeurs est belge, depuis de nom- breuses années, il enseigne a cette école, la botanique et la

la forét

sylviculture. Tous les trois ans, il va passer des vacances dans son pays natal, mais a chaque fois il revient a son poste. Il nous avoue étre captivé par la forét gabonai- se. Aprés nous avoir fait un bref historique de ]’Ecole, il invite ceux qui sont intéres- sés a le suivre dans une randonnée a pied dans la forét.

Quelqueés-uns préférent se rendre sur la plage, qui est a proximité de l’Ecole et ov il y a un excellent restaurant (nous aurons l'occasion d’y revenir dfher, avant notre départ de Libreville) la plu- part remontent dans deux autobus, qui nous transpor- tent a quelques kilométres. Nous débarquons a l’orée d'une clairiére et a pied suivons notre professeur sur un vieux chemin de charroya- ge de billots, presque oblité- ré par la végétation, car ici tout est propice a une crois- sance rapide: pluies abon- dantes pendant deux saisons de trois mois et chaleur tropicale.

Au cours de cette randon- née, le professeur nous récite un chapelet de noms latins, chacun étant le nom généri- que d’une espéce de bois ou de plante. Les deux plus grosses espéces d’arbres é- tant les fromages et l’oukou- mé. Ce dernier est un arbre géant, son bois est trés dur, si dur que les clous plient lorsque l'on essaie de les enfoncer. Le professeur nous informe que cette espéce est sous le contréle de l’Etat, qui Yexporte pour la construc- tion de quai maritime car il

ne pourrit pas, il sert aussi a

faire des rails, les rames du Métro de Paris roulent sur des rails en bois d’Oukoumé. On voit aussi quelques ar- bres dont la séve sert a faire le caoutchouc.

En revenant vers nos auto- bus, notre guide nous parle du projet d’hévéaculture de Mitzic, dans la province de Wola-Ntem. Ce projet de production de caoutchouc qui a ses débuts, s’étend sur une superficie de plus de 10,000 hectares, est réalisé par une société d’économie mixte “Hévéga” financée par |'Etat et l'entreprise privée. Une

CAMMAC

Stages de formation —

ae paneel, eGultages des Franco-Colombiens invite

us les musiciens amateurs a participer aux stages de

formation du Centre musical CAMMAC qui auront lieu

cette année durant les semaines du 27 juin au 11 juillet

ou du 8 avril au 22 aofit au Centre Musical situé dans les

Taureusaee québécoises a environ 105km a l’ouest de’ ontréal.

pour participer 4 ces stages de formation, les candidats doivent: 1, Avoir un intérét pour la musique classique, qu'importe le niveau de compétence (débutants, intermédiaires ou avancés); : 2. Avoir 18 ou-plus. : Vous pouvez vous inscrire 4 ces stages de formation, en communiquant avec votre organisme francophone local avant le 30 avril 1982. Tous les détails concernant ce programme vous seront alors remis.

Pour de plus amples informations, communiquez avec Suzanne Charest, coordinatrice d'activités de la F.F.C. au 669-5264. ‘

Trouvez votre adresse L’adresse d'un de nos abonnés est cachée dans les pages du journal. Cherchez bien et s'il s’agit de votre adresse, appelez-nous. Vous gagnerez un billet de loterie provinciale et peut-étre serez-vous lheureux(se] futur[e] millionnai- re.

de gauche adroite: _

Claude Gagné, Matane, P.Q., André Piolat, Vancouver, C.B.. Thérése Désy-Beaulieu, Val d'Or, P.Q., Léo Forget, Montréal, P.Q.. PHOTO PAR Henri Alain Lawless, directeur de l'information, affaires extérieures.

La Fonction publique du Canada offre The Public Service of Canada is Pe des chances égales d’emploi a tous an equal opportunity employer 2%, : % %

Le Soleil de Colombie, vendredi 2 avril 1982 7

production moyenne de 2,350 kilos de caoutchouc sec, par hectare est anticipé. L'im- portance de ce projet est qu'il crée la production d‘une matiére premiére renouvela- ble et stratégi- que pour I’économie nationa- le, créant un chiffre escom tés d’affaires de 2.8

CFR et eréant 1,300 emplois durant la premiére phase du développement pour éven- tuellement atteindre plus de 5,000 personnes.

Quittant la frafcheur--rela- tive—du sous-bois nous nous - retrouvons a la clairiére ou nous attendent les autobus. pour notre retour a Vhétel Oukoumé, car cette aprés-

Ingénieurs en électronique (2 postes)

Traitement: $33 070 - $37 033 NO de réf.: 82-NCRSO-EMR-4

Energie, Mines et Ressources Canada Centre canadien de télédétection. Ottawa (Ontario)

Fonctions :

Le Centre canadien de télédétection recherche des ingénieurs en électronique pour le Programme des opérations aéroportées. Les personnes choisies seront appelées a relever des défis au sein d'une équipe de scientifiques, d’ingénieurs et de technologues animés d’une grande motivation

_ qui s’emploient a élaborer des techniques de

pointe dans le domaine des systémes aéroportés de télédétection. Les titulaires devront participer a la conception, a l'installation, a la mise a l'essai, a lentretien, a I’étalonnage et a l’extension de télédétecteurs aéroportés, de systemes de naviga- tion, de systémes d’enregistrement de données ainsi que de systémes en temps réel et de systémes d’affichage. Ces systemes sont habituellement pilotés par micro-ordinateur ou mini- ordinateur et sont reliés 4 des périphériques com- muns, des systémes de navigation d’aéronefs et des magnétophones analogues et numériques.

Conditions de candidature Grade d’une université reconnue avec spécialisa- tion en génie électronique; ou admissibilité au titre

d'ingénieur professionnel au Canada avec spécialisation en génie électrique. Expérience de la conception du matériel et du logiciel de systemes pilotés par micro-processeur. La connaissance des processeurs LSI-11 et Z80 constitue un atout certain.

Exigences linguistiques La connaissance de l'anglais ou du frangais est re- quise pour un de ces postes. ;

Pour l'autre poste, la personne choisie exercera ses fonctions dans une importante mesure en frangais et en anglais. Les personnes bilingues et les personnes unilingues qui consentent a en- treprendre la formation linguistique et qui peuvent démontrer qu’elles ont les aptitudes voulues pour devenir bilingues sont invitées a poser leur candidature. é

NOS d’autorisation: 312-043-079, 312-043-080_

Comment se porter candidat Envoyez votre demande d'emploi ou votre curriculum vitae a:

Rachel Boisvert

a l’adresse ci-dessous,

Tél.: 593-5331 poste 485

Date limite: le 23 avril 1982

Agents, dangers mécaniques et électriques

Traitement: $26 871 - $30 280 N° de réf.: 82-NCRSO-CCA-02

Consommation et Corporations Canada Direction de la sécurité des produits Hull (Québec)

La direction de la sécurité des produits élabore des politiques, des lois et-des programmes d'inspection régionaux et veille Aleur mise en application, dans le but de déceler des produits de consommation qui présentent un danger, d’étabiir au besoin des réglements a cet égard et de faire en sorte que ces produits soient retirés du _ marché. Les principaux projets sont répartis entre trois divisions: la Division de la mécanique et de l'électricité, la Division de la chimie et de la biologie et la Division de I'inflammabilité.

.Fonctions - 4

Les fonctions qui leur incombent consistent entre

autres & élaborer et 4 mettre en application des

normes de sécurité, a répondre a des plaintes de consommateurs, & faire enquéte sur des produits et a les mettre a l'essai, ainsi qu’ élaborer le pro- gramme relatif 4 la sécurité des produits, en ce qui concerne les activités portant sur les produits mécaniques et électriques dangereux.

_ NO d’autorisation: 311-348-010

Conditions de candidature Détenir un dipléme acceptable d’une université reconnue, avec spécialisation en génie mécanique ou électrique, ou dans un domaine connexe. Expérience en coordination et gestion de projets relatifs € un domaine approprié du génie mé- canique ou électrique. a

Exigences linguistiques La personne choisie exercera ses fonctions dans une importante mesure en francais et en anglais. Les personnes bilingues et les personnes uni- lingues qui consentent a entreprendre la formation linguistique et qui, peuvent démontrer qu’elles ont les aptitudes voulues pour devenir bilingues sont invitées a poser leur candidature.

Comment se porter candidat Envoyez votre demande d’empioi ou votre curriculum vitae a:

Lise Lafontaine, Agent de dotation

a \’adresse ci-dessous, :

(613). 593-5331, poste 426

Date limite: le 16 avril 1982

Tout renseignement relatif a ce concours est disponible en francais et peut-étre obtenue en écrivant a cette adresse:

Additional job information is available by writing to this address:

Priére de toujours rappeler le numéro de référence approprié.

Bureau de dotation de la Région de la Capitale nationale - ;

Commission de la Fonction publique du Canada 300 Laurier Ouest

Ottawa (Ontario) K1A OM7

Canada

midi commencent nos visites