GVHD WATER QUALITY IMPROVEMENT PROGRAM

AVERAGE GVRD HOME OXNER WATER BILL COMPARED TO OTHER CITIES

105¢/m?

o

i39) @ os ~ “ u oO Omang onment © no]

PROGRAM COST IMPAC

patil

PROJECTED

BASE RATE UNFILTERED UNFILTERED

ee

CALGARY EDMONTON TORONTO SEATTLE PORTLAND (1990) (1990) (1990) (1990) (1990)

FIGURE 3,