Signage:

Not withstanding any provision of the "Sign Bylaw, 1982, No.2638", all signs and signage should be architecturally coordinated with the overall design of buildings and landscaping. Free-standing signs may be permitted only when all buildings in a development are set back at least six (6) meters (19.7 feet) from any street.

Free-standing signs shall not exceed 2.4 meters (8 feet) in height. External Lighting:

No commercial yard or building shall be illuminated, or contain light sources that illuminate, adjacent or nearby residential designated properties to an intensity similar to or higher than the levels of illumination that are created by existing street lights on the said residential designated properties.

Implementation:

To facilitate implementation of these guidelines, any Development Permit issued for property within this Development Permit Area XVI may, subject to the restrictions of the Municipal Act and unless otherwise specified in the above guidelines, vary or supplement any provisions of the bylaws regulating zoning, parking, works and services, drainage, signs, screening, landscaping and subdivision.

Minor variations to an approved Development Permit which do not change the intent of the guidelines may be permitted without an amendment of the Development Permit, subject to the approval of the Director of Community Planning.

ID617~25/27