H oa i } a ; f

THE CORPORATION OF THE CITY OF PORT COQUITLAM

Tony Chong DATE: 1989 09 06 City Engineer

Doug Riecken Deputy City Engineer

Selection of Consultant Handley Crescent & Penny Place Pump Station Designs

Requests for proposals for design of the Handley Crescent and Penny Place Pumping Stations were sent to five consulting firms known to have some experience in this field, Proposals were received from four of these firms and can be summarized as follows:

Item A Item B Total A+B Dayton & Knight 7,330 14,135 18,850 Ker Wood Leidal 30,000 36,000 66,000

Ker Priestman 16,000 Stanley 5,000 25,500 30,500

Item A is the complete design and preparation of cost estimates for Handley Crescent Pump Station.

Item B is the network analysis, design, preparation of cost estimates, and preparation of Specifications and contract documents for the Penny Place Pump Station.

Dayton and Knight have submitted the lowest price for this work. The total cost of $18,850 is below the $20,000 allocated,. although we would have to transfer some funds from the sewer design budget to the water to cover the respective costs.

[Tam prepared to recommend that we hire Dayton and Knight on the basis o£ my own experience with the work they have done for the District of Matsqui and the Central Fraser Valley Water Commission.

Kew fe

D.G. Riecken P. Eng. Deputy City Engineer