| | ry THE CORPORATION OF THE CITY OF PORT COQUITLAM C 0 U iy C

BY-LAW NO. 1677 JUN 14 1979

A By~law to amend the "City of Port Coquitlam Building and Plumbing

Code Administration By-law, 1974, No. 1298".

The Municipal Council of The Corporation of The City of Port Coquitiam,

in open meeting assembled, enacts as follows:

1. Clause (a) of Appendix "A" of the "City of Port Coquitiim Building

and Plumbing Code Administration By-law, 1974, No. 1298" is repealed and the

- following substituted therefor:

“(a) Value of Construction Permit Fee Pavable

; $ $ $ , 200.00. 3.00 201.00 500.00. 5.00 501.00 1,000.00. 7.50 1,001.00 2,000.00. 10.00 2,001.00 3,000.00. 13.00 3,001.60 4,000.00. 17.00 4,001.00 5,000.00. 21.00 5,001.00 6,000.00. 25.00 6,001.00 7,000.00. 29.00 7,001.00 8,000.00. 31.00 ' 8,001.00 9,000.00. 33.00 9,001.00 10,000.00. 35.00 10,001.00 11,000.00. 37.00 11,001.00 12,000.00. 39.00 12,001.00 13,000.00. , 41.00 13,001.00 14,000.00. 43.00 14,001.00 15,000.00. 45.00

plus $1.50 additional for each additional $1,000.00 of value." 2. . This By-law may be cited for all purposes as the "City of Port

Coquitlam Building and Plumbing Code Administration By-law, 1974, No. 1298,

Amendment By-law, 1979, No. 1677". ; , Nere. This By-law elhnvina tes the

400 per cluelliig unit charge. A voila ble for Fiest TuUkE€

Reachags. City Coen