Pub.Wks.Comm. re

Stop sign-Manning | ke: a Stop sign be placed on the North side of Manning Avenue at the Rast side

at Oxferd

Pub. Wks.Comm.re i sewer connection charge

City Clerk re_ ‘W/Wood | St. Traffic. “Reg. B/law #1193

April 9th. 1973

1973 Council Conmittee meeting, at which time it was agreed that if f the Di strict of Coquitian stiould be interested in discussing the pe possible, - erection ofa fire hall on the city's North side site the Couned would he _ prepared to | discuss this matter “with then. Alderman Laking inquired whether it was intended to include in the recommendation ‘that the city

pur sue the possibility of joint participation with the District ‘of Coquitlam in providing fire protection service. for the. North side District

City area and Alderman ‘Thompson advised that it was.

Moved by Alderman Thompson:

Seconded by Alderman Mabbett

That the recommendation of the Bud 1dj ing & Protection Committee “in its report concerning future Fire halt sites dated March ath, 1973, “approved at the April Znd, 1973 Council Committee meeting , that the site on the East.

side of the Coast Meridian Road-Lincola Avenue intersection be designated

as future fire hall, and that | a “site be purchased in the general immediate

area of the Legion iust East of Donald Street; AND THAT the District of Cogattlas be approached with respect ‘to poss- :

ible joint participation in the erection of a fire hall and provision of

fire protection at the proposed 1 Nerth side site. . Carried.

From the Public Works Committee, April ‘6th, 1973, reconending ‘that _

of Oxford Street.

Moved by Alderman Mabbett:

Seconded by. Alderman Traboulay:

“That as recommended in a report ‘from the Public & Works Connittes, a: Stop sign be placed on “the North side of Nanning Avenvie at the East side ‘of oxford Street. - a . . carried.

‘From the Public Works Committee, April 6th, 1973, recommending thet a0

change in the present sewer connection chav: 0 £ S140, 00 be considered at

this time.

Moved by Aldermin Mabbett:

Seconded by Alderman Traboulay: ~

| That as recommended ina report from. the Public Yorks Comittee, April 6th, 1973, no « change in the present gewer connection charge of $140. ee be considered at this tiwe. : ne carried.

From the City Clerk, April 6th, 1973, xegarding traffic reputations :

was} Westwood Street ‘and | submitetng a photocopy of By~ aw No. 1193sherein

Section 6 provides that the By-law will remain in force for ten 1 consecutive