Voting ‘for: Alderman’:

November 19th, 1973. “= 3 to: be elected, ; en - two year te Tm.

St. Catherine! s Viscount Cedar Mary Hill

Advanced

Anglican Church Alexander Drive Elementary School - School School

Hall -

_ TOTAL

CROLL, Rose’ Mary -

126 |

DUBOIS, Lucien Willie

Paul. Pierre

FDUCHARME, Joseph

LAKING, George Robert.

RERYLUK, John Joseph

1595- ELECTED

2685- ELECTED

“NaBBET, Eric WitLiag

2485- ELECTED

MORGAN, Edvard Mar shal

“1137

Ballot-paper account

Ballot Papers Received From: Printer . 9,000

St. Catherine! § . Viscount. Cedar Mary Hill

Anglican Church Alexander Drive Elementary Hall

Advanced

School.

Scheol. School .

TOTAL

Ballot-papers’ Issued

Ballot-papers Valid

_ Ballot-papers

Ballot~papers Rejected

‘Spoilt ‘or Missing

Tetal Ballots Cast’

"Ballot-papers U

‘Total Ballots.

400 53.

3.

740

1500

3. Voting for Regional Board Director oo L-to be elected,

“cMPELL, Jack Marshal}

1500-2:

1500

6100

1312

677 4

“681

3666

29

1

8696

188

1500 —

819

1500 1500

allot-papers Wi “Unissued

Total Ballots

2404

6100

2900 9900

(= for-a term co-incident with the elected Director’ Ss term as Mayor or Alderman.

- St. Catherine's “Viscount Cedar Mary H Hill

} Advanced

Anglican Gauxel: Alexander Drive Elementary School School,

Hall: -

School

TOTAL

“27.

417,

448

L700~ ELECTED

LAXING, George Robert

44

135

124

673

“ueyer. Philip Aemour

. Ballot-papers: Issued

3.

783

SCOTT, Loftus Bruce

7:

90

90

232

85

473

Ballot~paper account

Ballot. Papers Received from Printer

_ St.Catherine's

-. Advanced

Viscount Cedar Mary Hill

9,000

Anglican Church Alexander Drive Elementary

Hall

. School

School

Ballot-papers Valid

Ballot-papers Rejected

7 Ballot~papers ‘Spoilt |

or, missing

1500

732

16

1500.

School

1500

1500

TOTAL

6100

1286

28.

671

9

889

og

B629

‘| 67