ere Bryer

Renate 7

Parks and Recreation: 1. a) Tree cutting permit. b) Landscaping to be approved by Parks and Recreation Department. c) Meeting room for residents.

d) Boulevard trees to tie into trees in Reeve Street Park; boulevard trees to be located between sidewalk and property line, 4 trees spaced approximately 25' apart. Please use Liriodendron tulpipifera, Quercus Robur Fastigasa or Liquidambar Estyracif lua,

Fire Department:

Water supply requirements prior to construction.

R .

Two concerns: both dealing with the underground parking. The drawings do not indicate a security gate for the underground parking lot. Visitor and tenant parking should be separate with at least secure. parking for the tenants.

The other concern deals with the design of the locker areas. Both lockers are located close to an exit area and therefore will have to be secured with good dead bolt locks. The entrance for the lockers is somewhat —. isolated because of recess. I feel this isolates the tenant away from the openness of the underground. The recess also allows for a suspect to attempt to break in without being noticed by others in, the underground. Safety is always a factor with the widerground parking lots. Good visibility along with some crime prevention measures will greatly enhance _ the security of the building for years to come.

No Comments.

The’ project conforms to- zoning. regulations and the design guidelines in the: Official Community Plan except as noted. wea

ce ‘The front. yard setback re quires a. relaxation of 0. 6 ft. (from 24. 6 ft to” 24 ft.) which can be permitted under the Official Community Plan design guidelines. . .