a a Ur el "eo } pit ote * Hy aR Mp taada dyed ib teada Ny py alte dea dey wee ee Pee san aa tad On, Hs cant nth ; i ; a ny \ Crane ea 4s OR et yi ny OURS LRUASES Bm " y ade AM RLADT x Li rs , yt mines ait oY " iW i fim pri “ a it 1 f4 A He ibe AY

faa : Nag A Ree De ERR Nb

rede Ag haAUe Ange)

(1) Te construct, erect, String, or Otherwise install, Operate, maintain, remove and replace towers and polag with anchors, guy Wires, bracketa, Crossarns, insulators, Cransformers and their several attachments and one

OF more lines of Wire:

(11) To excavate for, install, Operate, maintain, abandon, ramove and replace (with Conduits, cables or Pipe of the

initial or any other size) one Or more

underground Conduite, whether or not

encased by concrete Of other Protective material, and cables with

all necessary attachments and

; | | ! i ‘7 } I :

fittings, and aboveyround or Underground transformers, and one or more underground Pipelines of

whatsoever kinds Of dimensions with

A ee a ce

necessary and PrOper aboveground or underground Valves. meters and other appliances and fittings and devices for controlling corrosion, all for uge in connection with such Pipeline or

lines,

for the transmission and distribution of Slactria energy and gas and for communication and aircraft Warning purposes (all of which ara hereinafter collectively Called “the works") Upon the portion (hereinafter Called "tha tight of Way area") described in Schedule ry hereto of the land described in Schedule [ hereto

(hecainafter callad “the land");

HLOGG6A

eh ne rn

PAA ate ve AY

i un

Wyatt

oes