tS prabes 8G why 2 ow bee oe © pee oe te acme OF oR ae BD 09 mp cine Ox ont prerae O On othe

— ROOreG DELANO 9 we Roe BOP FAOFESS ORV 2 POLI? 40 Wed 26 8 BD ROE GER « e

APYUALTL fhe

ayy F aps cme Comerae be ont

CITADEL HEIGHTS PARCEL 2

FE CRP, Oe.

md tees MEE cee ome cee Game eases meme wn) myesy

“Qh Anos

ee a se t ' t

| ps [—p—-

L, -

UPPER FLOOR PLAN

f i

~ ~sa ~

ee ef

274° SECM AT WW” OC. HOOP 943 GATT BERL ATIC F OP PELE VAR A BatehgR Oe met ECE

1

J c

NM

~

frm ne ne ee ae cm eo

Lom oh

> EVAR OVE pt) BRD BO HORS SOL RR VARS DART On reves OE

R-4y BATT ODAANON SE

7T awe

fo sre ae ee ee mae ete men rae mine any

Tore re Owe RAW wd

| | 71 |

wwe cine ene ere wenn mnie mine emo ane ol *,

Lea

cz

PEABVO CACH OT AS OC. NR

4

geo ooscrs

ree

xno

2ope"

not se

Ce taeda

|!

id ] '

MAIN FLOOR PLAN

t— tT es 0 {=

—e y A DENTE TOT BURT . . y . Raa > ‘ J r Sreaene } ; : i ‘ A nay