Minimum . Minimum Minimun Zone Parcel Arca Parcel Frontage Parcel Depth

RT-1 740 m” (7,965 sq.ft.) 18 m (59.1 £t.) 28 m (91.9 £t.)

RM-1 930 mn? {10,010 sq.ft.) 28 m (91.9 ft.) 28 m (91.9 ft.)

RM-2 930 m* (10,010 sq.ft.) 28 m (91.9 £t.) 28 m (91.9 ft.) RM-3 930 m= (10,010 sq.ft.) 28 m (91.9 ft.) 28 m (91.9 ft.)

RM--4 930 m= (10,010 sq.ft.) 28 m (91.9 ft.) 28 m (91.9 £t.)

, Commercial

Cc-1 (6,028 sq.ft.) (59.1 ft.) 28 m (91.9 ft.)

C=-2 : (6,028 sq,ft.) 3m (59.1 ft.) 28 m (91.9 ft.) C-3 , (6,028 sq.ft.) m (59.1 ft.) 28 m (91.9 ft.) C-4 . (6,028 sq.ft.) 10% of perimeter ” ¢8-1 (10,010 sq.ft.) 28 m (91.9 ft.) cs-2 (11,948 sq.ft.) 28 m (91.9 £t.) Cs-3 (1 acre) 10% of perimeter industrial M-1 . 1860 m2 (20,021 sq.ft.) 30 m (98.4 £2.) M-2 . 1.6 ha (4.0 acres) 10% of perimeter M-3 "930 m* (10,010 sq.ft.) 30 m (98.4 ft.) , Institutional P-1 : . 10% of perimeter P~2 10% of perimeter

P-~s 8 ha (19.8 acres) 10% of perimeter

(b) Where the lot lines are radial or nearly radial to a curved strect alignment, or where the side lot lines are not at right angles to the abutting street line, the "Minimum Parcel Frontage"

set forth in clause (a) of this Section:

(i) may be reduced to not less than 60% of stated minimum frontage where the lot is on the outside of the curve or where the side lot lines diverge from the front to the rear, provided the minimum width at the required front building line is not less than

the stated minimum parcel frontage; or