“STEEL SRUSS BRIDGE

STEEL GIRDER ' BRIDGE CONCRETE GIRDER . BRIDGE

Supplier or

Consultant Lougheed Machine & A.A. Williams & Assoc- Robertson, Kolbeins, ’ Welding iates Ltd. , Teevan & Gallaher Ltd.

_ Engineering and .

Construction Costs $40,370 $66,000 $67,000

Engineering ;

Inspection Guess 10% $4,100 Guess 10% $6,600 Guess 10% $6,700 Walkway West of

Coquitlam River $3,609 $3,600 $3,600

Walkway East of

Coquitlam River $9,900 $9,900 $9,900

Walkway Lighting $14,000 $14,000 $14,000

TOTAL ESTIMATED

COST $71,970 * $100,100 $101,200

* This estimate cannot be considered complete at this time.

Further engineering investigation and design is required.