a $f

sey Ey yiy : i ait : : Uo

Item

Gas Monitor Hyde Creek

Confined Space Exhaust Fan Hyde Creek

Tables & Chairs

Portable Computer

SCHEDULE A

Description

Safety item. Permits staff to monitor air quality in a confined space, prior to entry.

Safety item. Ensures a continuous source of fresh air in a confined space

Continue program of replacing tables and chairs at Hyde Creek Recreation Centre. This will purchase 30 x 5 foot tables and 60 chairs.

Many of the software functions

(i.e. budget, statistics, etc.)

we are starting to use are P.C.

based. At the present time, none of the supervisory or management staff have easy access toa P.C. This portable computer would be used of Department staff for these purposes.

(TEM

Amount

- $2,150

ny

: Sat,