|

OCT 23

DRAFT RESOLUTION

That the Agreement between The Corporation of the City of Port Coquitlam, Chevron Canada Limited, and Sentinel Holdings Ltd., wherein parking arrangements on Lots 14 to 17 inclusive, Block 4, District Lot 379, Plan 1213 (except part on plan with by-law filed 64934) relating to the

Marpole Avenue Liquor Store are detailed, be approved;

AND THAT His Worship the Mayor and City Clerk be authorized to

execute the said Agreement on behalf of the City and affix the Corporate

Seal thereto.

i ! | | i | | 4 t i 1 i H q }

i a Pe ee Be cei phe ha paeenynee Sere. pet tobe wet 4 eee oti

paar pioherym and vat Megeeetad yt th mate yg secre s stamps |