The sign area shall have a height of 1.2 m (3.9 ft.) and a width of 2.4 m (7.8 ft.).

The overall height of a freestanding development application sign and its supporting structures shall not exceed 2.4 m (7.8 ft.).

Development application signs shall be removed upon approval of the subject application by City Council."

This Bylaw may be cited for all purposes as "Port Coquitlam Sign Bylaw, 1992, No. 2638, Amendment Bylaw, 1993, No. 2763".

Read a first time by the Municipal Council this 15th day of February, 1993.

Read a second time by the Municipal Council this 15th day of February, 1993.

Read a third time by the Municipal Council this day of , 1993.

Reconsidered, finally passed and adopted by the Municipal Council of The Corporation of the City of Port Coquitlam this day of , 1993.

City Clerk