phe techy

wilt

gt nef, 4

re spsiny

abs bid

THE CORPORATION OF THE CITY OF PORT COQUITLAM

Public Works Committee DATE: March 03, 1994

Francis K.K. Cheung, P. Eng. FILE NO: PWC/900-301 Project Engineer

SHAUGHNESSY STREET CONSTRUCTION - STAFFORD TO NACHT

That Committee award the consulting services for the design and construction inspection of Shaughnessy Street construction between Stafford Avenue and Nacht Avenue to McElhanney

Engineering Services Ltd. in the amount of $62,131 (including G.S.T.).

Ten Consulting Engineering firms were invited for proposal for consulting services for the design and construction inspection of Shaughnessy Street from Stafford Avenue to Nacht Avenue. The following sight consulting engineering firms submitted a proposal by the deadline, 4:00 PM, February 22, 1994: Associated Engineering

Civic Consulting Group Ltd.

Deican Corporation

Duncan & Associated Engineering Ltd.

McElhanney Engineering Services Ltd.

PBK Engineering Lid.

Reid Crowther & Partners Ltd.

Sandwell Inc.

l 2 3 4 5. 6 7 8

After a thorough review of all the proposals, McElhanney Engineering Services Ltd. was chosen to provide consulting services for the design and construction inspection. PBK. Engineering Ltd. submitted the lowest consulting fee and McElhanney Engineering Services Ltd. submitted the second lowest; however, PBK Engineering Ltd. did not include the construction material testing cost, estimated to be $4,000 extra, in their fee. The following is the consultant fee submitted by PBK Engineering Ltd. and McEihanney Engincering Services

Ltd. for this project:

Description PBK Engineering Ltd. McElhanney Engineering Services Fee($) Ltd. |

Fee($

Design 27,060 22,756

Construction 24,435 31,271

Sub-Total 51,495 54,027

Contingency (15%) 7,724 8,104

Total 59,219* 62,132

Note: ® Construction material testing fee not included in consulting fee, estinated to be $4,000 extra.

—Cont.'d ../2-