SOUPER AU CENTRE CULTUREL

LE SAMED! #3 QC7OBRE A 6h PM AU MENU: Poulet BBQ a la Québeraoise

$5.00 enfant - $8.00 membre - $10.00 non mem.

ey we LES PORTES OUVRIRONT A

PORTEZ VOTRE COSTUME DE L' HALLOWEEN ANIMATION. POUR LES ENFANTS

PRIX DE PRESENCE ET PRIX.POUR LES COSTUMES

varia eli) iat (hones Sy Yous devez acheter vos billets avant le 20 oct.

Ih n°y aura pas de billets vendus a la porte.