THE CORPORATION OF. THE

CrIvy OF PORT COQUITLAM . MEMORANDUM ee! : 1 : ; ” TO:. Igor Zahynacz, P.Eng. 7 City Engineer co code FROM: Andrew de Boer a a Project Engineer DATE: November 4, 1991

RECOMMENDATION

- that the request from B.C. Transit for installation of the subject bus stop be approved 7

BACKGROUND 7 | —_ 7 B.C. transit has requested that a bus stop be a installed northbound Mary Hill farside Atkins Avenue — oe

(adjacent to the Terry Fox Uibcary on Mary Hill. Road) . . . 7 | oe This location was previously used as a bus stop but ae was abandoned with the rerouting of northbound buses.

via Wilson Avenue. On September 2, 1991, buses were rerouted back onto Mary Hill Road to serve the Terry.

Fox library and Recreation centre.

Andrew de Boer 7 _ | _ oe _ Project Engineer Co ae OE .

: : . vo . : : .

a

ae

Sw eS