(4) LOT COVERAGE:

(a) The maximum lot coverage is 35%, provided that where requirec off-street parking is constructed within a building, including an underground structure, the maximum lot coverage is increased by the proportion of the required parking so provided, multiplied by 0.25, to a maximum lot coverage of 602%.

Where surface parking, including aisles and driveways, is provided outside a building, including an underground structure, it shall not cover more than 15% of the lot.

Underground structures may occupy up to 95% of the lot surface, subject to compliance with all other provisions of this bylaw.

(5) FRONT YARD:

(a) On lots of an area of 1,700 m* (18,300 sq. ft.) or less, a front yard of not less than 7.5 m* (24.60 ft.) in depth is required.

(b) On lots having an area greater than 1,700 m (18,300 sq. ft.) a front yard is required in accordance with the following table:

Width of Building Required Front “8B percent of Lot Width Yard Depth

over 502% 3 x height. of building 412 to 502% 45 x height of building 31% to 50% -4 x height of building 20% to 30% -35 x height of building less than 20% 3x height of building

provided that in no case shall the front yard be less than 7.5 m (24.6 ft.) in depth.

(6) REAR YARD:

(a) For buildings not exceeding six storeys in heieht, a rear yard is required of not less than 7.5 m (24.6 ft.) in depth.

(b) For buildings exceeding six storeys in height, a rear yard is required in accordance with the following table:

Width of Building Required Rear as percent of Lot Width Yard Depth

over 50% 2 x height of building 41% to 502% 45 x height of building 31% to 50% -4 x height of building 20% to 30% 35 x height of building less than 20% 3 x height of building

provided that in no case shall the rear yard

be less than 7.5 m (24.6 fted—da epth ITEM | PAGE

2540

6 a>