>

3

WATER MAIN

LowER Warer Man

CULVERT LOwéER.

FoR THE <cirTy

LOWER SANITARY SEWER IMPROVEMESI

DEEPEen: ¢ WIDEA Prrari

“1SERMCING PY MOTH.

Ui 3 nas

bisa)

Curs § CBs

C : a kK d ")

RS

Pier cece

LIGHTS

“STREET

Lass. ses ap ten qt | | a 1

eahies

Mim, wath

3

eae Pk Re Sure

e.

aria he atv

e.