Alderman J, Keryluk

page 3. June 26, 1975

Lighting: 2x 4! recessed floures

Heating & Air Heating and air conditioning via ceiling

Conditioning: mounted difusers, 2 zone control (self- contained units for the exclusive use of the Lessee).

Access and Oo be from the Leigh Square Egress: frontage either direct

or to a main floor area of Square feet and then to the via the open stairway.

& proposal is intended to be a "Turn Key" Save and except library furnishings.

Should Council be interested in relocating the Library facility we would be pleased to meet with a Committee of Council ana staff to finalize a mutually acceptable proposal provided

Same could be ratified by Council prior to July 3lst, 1975.

In response to your suggestion, I shall be pleased to attend the June 30th meeting of Council i

proposal, answer questions and record suggestions from Mr. Overand and members of Council.

The foregoin proposal

Yours truly,

HORNER DEVELOPMENTS LTD. f

G. H. Horner eae | GHem

Enel.

ecs Mr. L. Pollock “City Administrator